TOOL	883340106
CFID	3
CMOD	2
SKEY	mariusz
STRE
	SGLB	354465
		STRE
			SORD	0
				CLAS	354008
			ESBR
			SGLB	General/Initialize
			ESBR
			SGLB	Winders/Tension Trigger
			ESBR
			SGLB	Winders/Tension Demand
			ESBR
			SGLB	Winders/Dia. Trigger
			ESBR
			SGLB	Winders/Current Dia
			ESBR
			SGLB	Winders/Web Break Dia
			ESBR
			SGLB	Winders/Senders
			ESBR
			SGLB	Winders/CD TE
			ESBR
			SGLB	Winders/Line Speed SP	/3v57/-120,120;Enter Line Speed Setpoint (%)...
			ESBR
			SGLB	Winders/Derivative SP	/3v57/-120,120;Enter Derivative SP (%)...
			ESBR
			SGLB	Winders/Derivative	/3v;Enter Derivative (-1.0 to 1.0)...
			ESBR
			SGLB	Winders/WB Threshold	/3v8,-100,100,0,100;Enter Web Break Threshold (% Full Roll)...
			ESBR
			SGLB	Winders/Rewind-Unwind	/3t73,Unwind,Rewind;Select Mode...
			ESBR
			SGLB	Winders/Forward-Reverse	/3t75,Reverse,Forward;Select Direction...
			ESBR
			SGLB	Winders/WB Reset	/3t12,Disabled,Enabled;Set Web Break Reset as...
			ESBR
			SGLB	Winders/Dancer Cal	/3v7,-100,100;Enter Calibration (%)...
			ESBR
			SGLB	Winders/Tension Delta	/3v7,-100,100;Enter Ramp Increament (%)...
			ESBR
			SGLB	Winders/Other Enable	/3t12,Disabled,Enabled;Set Other Enable as...
			ESBR
			SGLB	Winders/Stall Tension	/3v7,-100,100;Enter Stall Tension (%)...
			ESBR
			SGLB	Winders/Stall Select	/3e81,Fixed,Proportional;Stall Select...
			ESBR
			SGLB	Winders/Stall Enable	/3t12,Disabled,Enabled;Stall Enable...
			ESBR
			SGLB	Winders/Boost	/3v7,-100,100;Enter Boost (%)...
			ESBR
			SGLB	Winders/Boost Select	/3e81,Fixed,Proportional;Boost Select...
			ESBR
			SGLB	Winders/Boost Enable	/3t12,Disabled,Enabled;Boost Enable...
			ESBR
			SGLB	Winders/Tension SP	/3v7,-100,100;Enter Tension Setpoint (%)...
			ESBR
			SGLB	Winders/Taper SP	/3v7,-100,100;Enter Taper Setpoint (%)...
			ESBR
			SGLB	Winders/Taper Select	/3e83,Linear,Hyperbolic;Taper Select...
			ESBR
			SGLB	Winders/UTS Threshold	/3v57/-120,120;Enter Threshold (0 - 120%)...
			ESBR
			SGLB	Winders/Over-Under	/3t77,Under,Over;Set Overwind/Underwind as ...
			ESBR
			SGLB	Winders/Tension Enable	/3t12,Disabled,Enabled;Set Tension Enable as...
			ESBR
			SGLB	Winders/Base Speed	/3v7,-100,100;Enter Base Speed (%)...
			ESBR
			SGLB	Winders/Derivative Cal	/3v7,-100,100;Enter Derivative Calibration (%)...
			ESBR
			SGLB	Winders/Fixed Inertia	/3v7,-100,100;Enter Fixed Inertia (%)...
			ESBR
			SGLB	Winders/Variable Inertia	/3v7,-100,100;Enter Variable Inertia (%)...
			ESBR
			SGLB	Winders/Width	/3v7,-100,100;Enter Width (%)...
			ESBR
			SGLB	Winders/Static Comp	/3v38,-200,200;Enter Static Comp (-200% to 200%)...
			ESBR
			SGLB	Winders/Dynamic Comp	/3v38,-200,200;Enter Dynamic Comp (-200% to 200%)...
			ESBR
			SGLB	Winders/Tension Scale	/3v7,-100,100;Enter Tension Scale (%)...
			ESBR
			SGLB	Winders/Tension Trim	/3v38,-200,200;Enter Tension Trim (-200% to 200%)...
			ESBR
			SGLB	Winders/Tension Cal	/3v7,-100,100;Enter Tension Calibration (%)...
			ESBR
			SGLB	Winders/Min Diameter	/3v8,-100,100;Enter Minimum Diameter (% Full Roll)...
			ESBR
			SGLB	Winders/Diameter Filter	/3v;Enter Diameter Filter (0 - 1.0)...
			ESBR
			SGLB	Winders/Diameter Hold	/3t89,Track,Hold;Enter Diameter Hold state...
			ESBR
			SGLB	Winders/Preset Enable	/3t12,Disabled,Enabled;Set Preset as ...
			ESBR
			SGLB	Winders/Min Speed	/3v57,-120,120;Enter Minimum Speed (%)...
			ESBR
			SGLB	Winders/Line Speed	/3v57/-120,120;Enter Line Speed (%)...
			ESBR
			SGLB	Winders/Winder Speed	/3v57/-120,120;Enter Winder Speed (%):
			ESBR
			SGLB	Winders/Build Up	/3v41,-100,100,1,20;Build Up (1 - 20)...
			ESBR
			SGLB	Winders/Run Delta	/3v8,-100,100,0,100;Enter Speed Demand Run Delta (%)...
			ESBR
			SGLB	Winders/Stop Delta	/3v8,-100,100,0,100;Enter Speed Demand Stop Delta (%)...
			ESBR
			SGLB	Winders/Jog Speed	/3v57,-120,120;Enter Jog Speed (%)...
			ESBR
			SGLB	Winders/Start	/3t12,Disabled,Enabled;Set Start as ...
			ESBR
			SGLB	Winders/Jog	/3t12,Disabled,Enabled;Set Jog as ...
			ESBR
			SGLB	Winders/Overspeed	/3v57,-120,120;Enter Overpeed (%)...
			ESBR
			SGLB	Winders/Ext Diameter	/3v7,-100,100;Enter Ext. Diameter (% Full Roll)...
			ESBR
			SGLB	Winders/Ext Dia Select	/3t12,Core,External;Set Diameter Select as...
			ESBR
			SGLB	Winders/Core 1	/3v7,-100,100;Enter Core 1 (% Full Roll)...
			ESBR
			SGLB	Winders/Core 2	/3v7,-100,100;Enter Core 2 (% Full Roll)...
			ESBR
			SGLB	Winders/Core Select	/3t92,Core 1,Core 2;Select Core...
			ESBR
			SGLB	Winders/Get Web Break	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get WB Threshold	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Rewind-Unwind	/2t72,Unwind,Rewind
			ESBR
			SGLB	Winders/Get Forward-Reverse	/2t74,Reverse,Forward
			ESBR
			SGLB	Winders/Get WB Reset	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Tension Enable	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Dancer Cal	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get In Tension	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Tension Delta	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Tension Demand	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Stall Tension	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Stall Select	/2e80,Fixed,Proportional
			ESBR
			SGLB	Winders/Get Stall Enable	/2t,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Boost	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Boost Select	/2e80,Fixed,Proportional
			ESBR
			SGLB	Winders/Get Boost Enable	/2t,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Tension SP	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Taper SP	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Taper Select	/2e82,Linear,Hyperbolic
			ESBR
			SGLB	Winders/Get Up to Speed	/2t4,false,true
			ESBR
			SGLB	Winders/Get UTS Threshold	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Line Speed SP	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Over-Under	/2t76,Under,Over
			ESBR
			SGLB	Winders/Get S & D Comp	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Inertia Comp	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Derivative Cal	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Derivative SP	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Fixed Inertia	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Variable Inertia	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Width	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Current Demand	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Scaled Derivative	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Speed Demand	/2v58,-120,120;%1.1f%%
			ESBR
			SGLB	Winders/Get Other Enable	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Pos Current	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Neg Current	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Base Speed	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Static Comp	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Dynamic Comp	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Tension Scale	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Tension Trim	/2v37,-200,200;%3.2f%%
			ESBR
			SGLB	Winders/Get Tension Cal	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Min Diameter	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Diameter Filter	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Diameter Hold	/2t90,Tracking,Holding
			ESBR
			SGLB	Winders/Get Diameter Preset	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Preset Enable	/2t11,Disabled,Enabled;
			ESBR
			SGLB	Winders/Get Min Speed	/2v58,-120,120;%1.1f%%
			ESBR
			SGLB	Winders/Get Line Speed	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Winder Speed	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Build Up	/2v9,-100,100;%1.2f
			ESBR
			SGLB	Winders/Get Diameter	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Ramped Speed	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Run Delta	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Stop Delta	/2v6,-100,100;%1.2f%%
			ESBR
			SGLB	Winders/Get Jog Speed	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Start	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Jog	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Overspeed	/2v58,-120,120;%1.2f%%
			ESBR
			SGLB	Winders/Get Ext Diameter	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Ext Dia Select	/2t11,Disabled,Enabled
			ESBR
			SGLB	Winders/Get Core 1	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Core 2	/2v6,-100,100;%1.2f%% Full Roll
			ESBR
			SGLB	Winders/Get Core Select	/2t92,Core 1,Core 2
			ESBR
		ESTR
	ESBR
	SGLB	354009
		STRE
			SORD	0
				CLAS	354008
			ESBR
			SGLB	General/Initialize
			ESBR
		ESTR
	ESBR
	SGLB	354008
		STRE
			SORD	0
				CSYM	354009
			ESBR
			SGLB	General/Initialize
			ESBR
			SGLB	Hierarchy/Attach Conn
			ESBR
			SGLB	Hierarchy/Remove Conn
			ESBR
		ESTR
	ESBR
	SGLB	354157
		STRE
			SORD	0
				CLAS	354008
			ESBR
			SGLB	Utility/Event
			ESBR
			SGLB	Utility/Trigger
			ESBR
			SGLB	Utility/Get Next
			ESBR
			SGLB	Utility/Debug	/1
			ESBR
			SGLB	Utility/Get Address Matches	/2u2
			ESBR
			SGLB	Utility/Get CRC Errors	/2u2
			ESBR
			SGLB	Utility/Get Overruns	/2u2
			ESBR
			SGLB	Utility/Get Fragments	/2u2
			ESBR
			SGLB	Utility/Get State	/4u,1,3000;Enter address|e,Unknown,Halted,No Configuration,L Error,H Error,Selt-Test Failure,Abort,OK,Network Warning,Network Failure
			ESBR
			SGLB	Utility/Filter
			ESBR
		ESTR
	ESBR
	SGLB	354044
		STRE
			SORD	0
				CLAS	354008
			ESBR
		ESTR
	ESBR
ESTR
